CREATE DATABASE p2
 	ENCODING = 'UTF8'
 	LC_COLLATE = 'en_US.UTF-8'
 	LC_CTYPE = 'en_US.UTF-8'
 	TABLESPACE = pg_default
 	OWNER = postgres;
